P)assword: This command allows you to change your password which you
selected when first logging onto RBBS-PC.

You can alter your password by issuing the "P" command and responding to
the prompt. RBBS-PC expects your new password when you next log on.
Passwords can have up to 15 characters.

TIPS:

1. Anyone who knows your password can log on as you and read your personal
mail, or to use other system privileges that you may have.

2. You should change your password if you have reason to believe that it is
known to other persons.
